
diff -r c5c55937e44c -r 733187d496d0 opensips/scripts/mysql/lcr-create.sql
--- a/opensips/scripts/mysql/lcr-create.sql	Wed Feb 10 21:14:04 2010 +0100
+++ b/opensips/scripts/mysql/lcr-create.sql	Wed Feb 10 21:21:24 2010 +0100
@@ -10,6 +10,9 @@
     strip TINYINT UNSIGNED,
     tag CHAR(16) DEFAULT NULL,
     flags INT UNSIGNED DEFAULT 0 NOT NULL,
+    user CHAR(16) DEFAULT NULL,
+    realm CHAR(16) DEFAULT NULL,
+    passwd CHAR(16) DEFAULT NULL,
     CONSTRAINT gw_name_idx UNIQUE (gw_name)
 ) ENGINE=MyISAM;
 




